Software Engineering Project “Bugfind” Implementation Document

Project group Perttu Haimi, Petteri Hintsanen, Philipp Masche, Toni Ruokolainen and Osku Salerma

Instructor Peter Lamberg

Helsinki 3rd May 2001 Implementation Document UNIVERSITY OF HELSINKI Department of Computer Science

1 Implementation

Implementation went more or less exactly as specified in the design document, no modifications were needed. However, during the implementation some tools were developed to help with the debugging of the modules. These tools are briefly documented in the maintenance document. Please note that they are not intented to be used by the users of the Bugfind system, since they are severely untested and very probably buggy, and the formal documentation is non-existing.

The description about the implementation environment can be found from the requirements specification document.

The CVS directory structure for the project can be found from the maintenance document.

2