\section{Architecture diagram}

This section contains a diagram of the division of the software into the generator and the executable program the generator produces. 

\begin{figure}[ht]
%\begin{center}
\epsfig{file=content/diagrams/dataflow.ps,height=10cm}
%\end{center}
\caption{A diagram of the software input/output files and data flow.}
\label{fig: dataflow}
\end{figure}

Figure~\ref{fig: dataflow} represents the generator and the result program that it produces, and how the data files are used by them. Every rectangle is a file (except for the generator and the result program). An arrow means that data from the component at the source of the arrow is used by the component that the arrow leads to.