\section{Risk review}

This section presents the risks described in Project plan and their final status, that is, whether the risk has realized or not.

The fields of the following table:
\begin{itemize}
\item Risk name: a short description of the risk also found in the project plan
\item Probability: the estimated likelihood of the risk coming true, on a scale of `Low, Moderate, High'.
\item Seriousness: an estimate of impact on the project, `High' being the most serious, `Moderate' and `Low' the other choices.
\item Final status: this is the risk's status at the end of the project\\
\end{itemize}

\begin{tabular}[]{| l | l | l | l |}
\hline 
Risk name & Probability & Seriousness & Final status \\
\hline
Temporary loss of work force & High & Low & Realized \\
\hline
Permanent loss of work force & Low & High & Realized - twice\\
\hline
CS network failure & Moderate & Moderate & Realized \\
\hline
Loss of project data & Moderate & Moderate & Not realized \\
\hline
A part of the project is delayed & Moderate & High & Realized \\
\hline
Schedule pressure & Moderate & Moderate & Realized \\
\hline
Evolution of requirements & Low & High & Not realized \\
\hline
Over-planning & Moderate & Moderate & Not realized \\
\hline
Over-prototyping & Moderate & Moderate & Not realized \\
\hline
Harder than expected & Moderate & Moderate & Not realized \\
\hline
The problem is more extensive than expected & Moderate & High & Not realized \\
\hline
Incompatibility & Moderate & High & Not realized \\
\hline
Fortran issues & Moderate & High & Realized to some extent \\
\hline
Mis-implementation & Moderate & High & Cannot be determined \\
\hline
Wrong approach & Moderate & High & Cannot be determined \\
\hline
Lack of technical specification & Moderate & Moderate & Not realized \\
\hline
\end{tabular}

There were no realized risks that were not found out at the project planning phase.



