%%
%% Esimerkki liitteiden käytöstä
%%
\internalappendix{\theappendix}{Coverage Report}

This is a short summary of the code coverage for the tests performed. For details see the testing code coverage report on the PIANOS CD-ROM or [coverage].

\textbf{OVERALL COVERAGE SUMMARY}

\begin{tabular}[]{| l | l | l | l | l |}
\hline
name	& class, \% &	method, \% &	block, \% &	line, \% \\
\hline
all classes	& 100\% (28/28)	& 92\% (213/231) & 88\% (18171/20737)	& 91\%  (3493/3818) \\
\hline
\end{tabular}
\vspace{0.5cm}

\textbf{OVERALL STATS SUMMARY}

\begin{itemize}

\item total packages:	5
\item total executable files:	28
\item total classes:	28
\item total methods:	231
\item total executable lines:	3818

\end{itemize}

\textbf{COVERAGE BREAKDOWN BY PACKAGE}


\begin{tabular}[]{| l | l | l | l | l |}
\hline
name	& class, \%	& method, \%	& block, \%	& line, \% \\
\hline
PIANOS.io	& 100\% (2/2)	& 96\%  (26/27)	& 80\%  (4280/5328)	& 91\%  (974,2/1070) \\
\hline
PIANOS	& 100\% (1/1)	& 71\%  (5/7)	& 89\%  (685/773)	& 88\%  (148,2/169) \\
\hline
PIANOS.generator	& 100\% (6/6)	& 90\%  (54/60)	& 90\%  (10211/11322) &	93\%  (1810,2/1955) \\
\hline
PIANOS.datastructures	& 100\% (13/13)	& 93\%  (122/131) & 	90\%  (2971/3290)	 & 90\%  (548,3/612) \\
\hline
PIANOS.exceptions	& 100\% (6/6)	& 100\% (6/6)	& 100\% (24/24)	& 100\% (12/12) \\
\hline
\end{tabular}


\internalappendix{\theappendix}{Expected results for the tests of Acceptation}
\label{app_unit_acc}
\input{content/unit_acc_simple_bird}
\input{content/unit_acc_cancer}
\input{content/unit_acc_all_stoc}
\input{content/unit_acc_all_func}
\input{content/unit_acc_all_spat}

